-- salix.accessTokenConfig
ALTER TABLE salix.accessTokenConfig MODIFY COLUMN id int(10) unsigned NOT NULL;
ALTER TABLE salix.accessTokenConfig ADD CONSTRAINT accessTokenConfig_check CHECK (id = 1);

-- salix.printConfig
ALTER TABLE salix.printConfig MODIFY COLUMN id int(10) unsigned NOT NULL;
ALTER TABLE salix.printConfig ADD CONSTRAINT printConfig_check CHECK (id = 1);
