ALTER TABLE `vn`.`sector` DROP COLUMN `printerFk`;
ALTER TABLE `vn`.`sector` ADD COLUMN `mainPrinterFk` tinyint(3) unsigned;
ALTER TABLE `vn`.`sector` ADD CONSTRAINT sector_FK_1 FOREIGN KEY (mainPrinterFk) REFERENCES vn.printer(id) ON DELETE CASCADE ON UPDATE CASCADE;
