ALTER TABLE `vn`.`smsConfig` ADD apiKey varchar(50) NULL;
ALTER TABLE `vn`.`smsConfig` CHANGE `user` user__ varchar(50) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL;
ALTER TABLE `vn`.`smsConfig` CHANGE password password__ varchar(50) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL;
ALTER TABLE `vn`.`sms` MODIFY COLUMN statusCode smallint(9) DEFAULT 0 NULL;
ALTER TABLE `vn`.`sms` MODIFY COLUMN status varchar(255) CHARACTER SET utf8 COLLATE utf8_unicode_ci DEFAULT 'OK' NULL;
