CREATE TABLE IF NOT EXISTS `vn`.`bionicConfig` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `generalInflationCoeficient` double(10,2) NOT NULL,
  `minimumDensityVolumetricWeight` double(10,2) NOT NULL,
  `verdnaturaVolumeBox` int(11) NOT NULL,
  `itemCarryBox` int(11) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;


INSERT INTO `vn`.`bionicConfig` (`generalInflationCoeficient`, `minimumDensityVolumetricWeight`, `verdnaturaVolumeBox`, `itemCarryBox`)
    VALUES
        (1.30, 167.00, 138000, 71);
