ALTER TABLE vn.dua CHANGE awbFk awbFk__ smallint(11)  unsigned DEFAULT NULL NULL COMMENT '@Deprecated refs #5871 01/10/2023';
ALTER TABLE vn.dua DROP FOREIGN KEY dua_fk2;
