CREATE TABLE vn.quadMindsConfig (
	id int(10) unsigned NULL,
	apiKey varchar(255) DEFAULT NULL NULL,
	CONSTRAINT quadMindsConfig_pk PRIMARY KEY (id),
	CONSTRAINT quadMindsConfig_check CHECK (id = 1)
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;
