-- Place your SQL code here
CREATE OR REPLACE TABLE floranet.config (
	email varchar(255) DEFAULT 'floranet@verdnatura.es' NOT NULL
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;


