CREATE TABLE `vn`.`starredModule` (
  `id` INT(11) unsigned NOT NULL AUTO_INCREMENT,
  `workerFk` INT(10) NOT NULL,
  `moduleFk` VARCHAR(45) COLLATE utf8_unicode_ci NOT NULL,
  PRIMARY KEY (`id`),
  KEY `starred_workerFk` (`workerFk`),
  KEY `starred_moduleFk` (`moduleFk`),
  CONSTRAINT `starred_workerFk` FOREIGN KEY (`workerFk`) REFERENCES `vn`.`worker` (`id`) ON UPDATE CASCADE,
  CONSTRAINT `starred_moduleFk` FOREIGN KEY (`moduleFk`) REFERENCES `salix`.`module` (`code`) ON UPDATE CASCADE
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;