CREATE TABLE vn.bankEntityConfig (
	id INT auto_increment NULL,
	bicLength TINYINT DEFAULT 11 NULL COMMENT 'Tamaño del campo bic',
	CONSTRAINT bankEntityConfig_PK PRIMARY KEY (id)
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;

INSERT INTO vn.bankEntityConfig (id, bicLength) VALUES(1, 11);