CREATE TABLE IF NOT EXISTS `vn`.`improvedGeneralLog` (
    user char(128) DEFAULT NULL,
    db char(64) DEFAULT NULL,
    tables char(64) DEFAULT NULL,
    type set('Select','Insert','Update','Delete'),
    PRIMARY KEY(user, db, tables)
) ENGINE=InnoDB;

CREATE TABLE IF NOT EXISTS `vn`.`improvedGeneralLogProcedures` (
    user char(128) DEFAULT NULL,
    db varchar(250) DEFAULT NULL,
    routine char(64) DEFAULT NULL,
    type enum('FUNCTION','PROCEDURE') NOT NULL,
    PRIMARY KEY(user, db, routine, type)
) ENGINE=InnoDB;
