ALTER TABLE vn.improvedGeneralLog CONVERT TO CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci;
ALTER TABLE vn.improvedGeneralLogProcedures CONVERT TO CHARACTER SET utf8mb3 COLLATE utf8mb3_general_ci;
