ALTER TABLE `account`.`role` MODIFY COLUMN name varchar(79) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci NOT NULL COMMENT 'MariaDB doesn''t support more than 79 chars for proxied user names';

