USE vn;
CREATE TABLE vn.`arcRead` (
  `id` smallint(2) unsigned NOT NULL AUTO_INCREMENT,
  `printerFk` tinyint(3) unsigned,
  PRIMARY KEY (`id`),
  CONSTRAINT `worker_printer_FK` FOREIGN KEY (`printerFk`) REFERENCES `printer` (`id`) ON DELETE CASCADE ON UPDATE CASCADE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_unicode_ci;
