CREATE OR REPLACE TABLE `vn`.`screen` (
	id INT(11) AUTO_INCREMENT NOT NULL,
	`name` VARCHAR(100) NOT NULL,
	modelFk VARCHAR(50) NOT NULL,
	CONSTRAINT screen_PK PRIMARY KEY (id),
	CONSTRAINT screen_FK FOREIGN KEY (modelFk) REFERENCES vn.screenModel(code) ON UPDATE CASCADE
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;
