CREATE TABLE stock.config (
	id INT UNSIGNED auto_increment NOT NULL,
	saleLife INT UNSIGNED NOT NULL COMMENT 'Maximum sales cache lifetime in days',
	CONSTRAINT config_pk PRIMARY KEY (id)
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_general_ci;
