ALTER TABLE vn.componentType
    CHANGE code code varchar(20) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci DEFAULT NULL NULL AFTER id;
ALTER TABLE vn.componentType
    CHANGE `type` name varchar(45) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci NOT NULL;
UPDATE IGNORE vn.componentType
	SET code = LOWER(code);
UPDATE IGNORE vn.componentType
	SET code = 'other'
	WHERE id = 12;