-- Place your SQL code here
ALTER TABLE vn.mrwConfig ADD IF NOT EXISTS clientTypeWidth int(10) unsigned NULL 
    COMMENT 'If it does not reach the required value, it will be padded with zeros on the left to meet the specified length.';

UPDATE vn.mrwConfig 
	SET clientTypeWidth = 6;