USE vn;

CREATE TABLE IF NOT EXISTS ormConfig (
  id int(5) NOT NULL AUTO_INCREMENT primary key,
  selectLimit int(5) NOT NULL
);

INSERT IGNORE INTO ormConfig SET selectLimit = 1000;