ALTER TABLE `vn`.`travelThermograph` DROP FOREIGN KEY travelThermographDmsFgn;
ALTER TABLE `vn`.`travelThermograph` ADD CONSTRAINT travelThermographDmsFgn FOREIGN KEY (dmsFk) REFERENCES vn.dms(id) ON DELETE CASCADE ON UPDATE CASCADE;
