
USE vn;
RENAME TABLE machineWorker TO machineWorker__;
ALTER TABLE machineWorker__ COMMENT = '@deprecated 2024-10-23 not used';

RENAME TABLE machineWorkerConfig TO machineWorkerConfig__;
ALTER TABLE machineWorkerConfig__ COMMENT = '@deprecated 2024-10-23 not used';

DELETE FROM salix.ACL WHERE model = 'MachineWorker';
