CREATE TABLE `edi`.`floricodeConfig` (
	`id` int(10) unsigned NOT NULL,
	`url` varchar(100) NOT NULL,
	`user` varchar(50) NOT NULL,
	`password` varchar(100) NOT NULL,
	PRIMARY KEY (`id`),
	CONSTRAINT `floricodeConfig_check` CHECK (`id` = 1)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_unicode_ci;

INSERT INTO salix.ACL (model,property,accessType,permission,principalType,principalId)
	VALUES ('Edi','syncData','WRITE','ALLOW','ROLE','system');
