ALTER TABLE edi.tableMultiConfig
	ADD CONSTRAINT tableMultiConfig_pk PRIMARY KEY (id),
	MODIFY COLUMN id int(10) unsigned auto_increment NOT NULL,
	ADD CONSTRAINT tableMultiConfig_unique UNIQUE KEY (toTable);
