ALTER TABLE vn.config CHANGE bookFk bookFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialAFk serialAFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialEFk serialEFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialRFk serialRFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialCFk serialCFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialHFk serialHFk__ int(11) NOT NULL;
ALTER TABLE vn.config CHANGE serialPFk serialPFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialTFk serialTFk__ int(11) DEFAULT 0 NULL;
ALTER TABLE vn.config CHANGE serialMFk serialMFk__ int(11) DEFAULT 0 NULL;
