-- Place your SQL code here
ALTER TABLE  vn.entry ADD IF NOT EXISTS lockerUserFk int(10) unsigned NULL;
ALTER TABLE vn.entry ADD IF NOT EXISTS locked DATETIME DEFAULT NOW() NULL;
ALTER TABLE vn.entry ADD CONSTRAINT entryAccountFk FOREIGN KEY IF NOT EXISTS (lockerUserFk) REFERENCES account.`user`(id);

ALTER TABLE vn.entry CHANGE isBlocked isBlocked__ tinyint(4) DEFAULT 0 NOT NULL COMMENT 'Deprecado 04/07/2023';

ALTER TABLE  vn.entryConfig ADD IF NOT EXISTS maxLockTime int(10) unsigned NULL COMMENT 'Tiempo máximo que puede estar una entrada bloqueada en segundos';

UPDATE vn.entryConfig
    SET maxLockTime = 300;