ALTER TABLE vn.project ADD stateFk varchar(25) DEFAULT 'open';

CREATE TABLE vn.projectState (
	code  varchar(25) NOT NULL,
	description varchar(100) NOT NULL,
	CONSTRAINT projectState_PK PRIMARY KEY (code)
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;

INSERT INTO vn.projectState (code,description)
	VALUES ('open','Abierto');
INSERT INTO vn.projectState (code,description)
	VALUES ('inProgress','En progreso');
INSERT INTO vn.projectState (code,description)
	VALUES ('closed','Cerrado');

ALTER TABLE vn.project ADD CONSTRAINT project_FK_3 FOREIGN KEY (stateFk) REFERENCES vn.projectState(code);

