SET FOREIGN_KEY_CHECKS = 0;
ALTER TABLE `vn`.`report` MODIFY COLUMN id tinyint(3) unsigned NOT NULL AUTO_INCREMENT;
ALTER TABLE `vn`.`printer` MODIFY COLUMN id tinyint(3) unsigned NOT NULL AUTO_INCREMENT;
SET FOREIGN_KEY_CHECKS = 1;
