CREATE TABLE `vn`.`mdbApp` (
  `app` varchar(100) COLLATE utf8mb3_unicode_ci NOT NULL,
  `baselineBranchFk` varchar(255) COLLATE utf8mb3_unicode_ci DEFAULT NULL,
  `userFk` int(10) unsigned DEFAULT NULL,
  `locked` datetime DEFAULT NULL,
  PRIMARY KEY (`app`),
  KEY `mdbApp_FK` (`userFk`),
  KEY `mdbApp_FK_1` (`baselineBranchFk`),
  CONSTRAINT `mdbApp_FK` FOREIGN KEY (`userFk`) REFERENCES `account`.`user` (`id`) ON DELETE SET NULL ON UPDATE CASCADE,
  CONSTRAINT `mdbApp_FK_1` FOREIGN KEY (`baselineBranchFk`) REFERENCES `mdbBranch` (`name`) ON UPDATE CASCADE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_unicode_ci
