ALTER TABLE `vn`.`mdbApp` DROP PRIMARY KEY;
ALTER TABLE `vn`.`mdbApp` ADD CONSTRAINT mdbApp_PK PRIMARY KEY (app,baselineBranchFk);

INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('com','master');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('enc','master');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('ent','master');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('eti','master');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('lab','master');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('tpv','master');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('com','dev');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('enc','dev');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('ent','dev');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('eti','dev');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('lab','dev');
INSERT INTO `vn`.`mdbApp` (app,baselineBranchFk)
	VALUES ('tpv','dev');

