DELIMITER $$
CREATE OR REPLACE DEFINER=`vn`@`localhost` TRIGGER `vn`.`zoneEvent_beforeUpdate`
	BEFORE UPDATE ON `zoneEvent`
	FOR EACH ROW
BEGIN
	SET NEW.editorFk = account.myUser_getId();
END$$
DELIMITER ;
