CREATE TABLE `util`.`config` (
  `id` INT UNSIGNED NOT NULL AUTO_INCREMENT,
  `dbVersion` CHAR(11) NULL DEFAULT NULL COMMENT 'The current database version',
  `hasTriggersDisabled` TINYINT(1) NOT NULL DEFAULT 0 COMMENT 'Defines if triggers are disabled',
  `environment` VARCHAR(45) NULL DEFAULT NULL COMMENT 'The current Database environment',
  PRIMARY KEY (`id`))
COMMENT = 'Global configuration table';
