CREATE OR REPLACE TABLE `vn`.`scannerModel` (
	code VARCHAR(50) NOT NULL,
	CONSTRAINT scannerModel_UN PRIMARY KEY (code)
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;
