CREATE TABLE vn.quadMindsApiConfig (
	id int(10) unsigned NULL PRIMARY KEY,
	`url` varchar(255) DEFAULT NULL NULL,
	`key` varchar(255) DEFAULT NULL NULL,
	CONSTRAINT quadMindsConfig_check CHECK (id = 1)
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;
