ALTER TABLE `vn`.`travelThermograph`
ADD COLUMN `maxTemperature` DECIMAL(5,2) NULL AFTER `temperatureFk`,
ADD COLUMN `minTemperature` DECIMAL(5,2) NULL AFTER `maxTemperature`;
