DROP TRIGGER `vn`.`travelThermograph_beforeInsert`;

ALTER TABLE `vn`.`travelThermograph` CHANGE `temperature` `temperature__` enum('COOL','WARM','DRY') CHARACTER SET utf8 COLLATE utf8_unicode_ci DEFAULT NULL NULL;

CREATE OR REPLACE
ALGORITHM = UNDEFINED VIEW `vn2008`.`travel_thermograph` AS
select
    `tt`.`thermographFk` AS `thermograph_id`,
    `tt`.`created` AS `odbc_date`,
    `tt`.`warehouseFk` AS `warehouse_id`,
    `tt`.`travelFk` AS `travel_id`,
    `tt`.`temperatureFk` AS `temperature`,
    `tt`.`result` AS `result`,
    `tt`.`dmsFk` AS `gestdoc_id`
from
    `vn`.`travelThermograph` `tt`;