ALTER TABLE vn.dmsType CHANGE `path` path__ varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci NOT NULL COMMENT '@deprecated 2024-01-08 refs #6410';
ALTER TABLE vn.dmsType MODIFY COLUMN path__ varchar(255) CHARACTER SET utf8mb3 COLLATE utf8mb3_unicode_ci NOT NULL COMMENT '@deprecated 2024-01-08 refs #6410';
