ALTER TABLE `vn2008`.`awb_unit` RENAME `vn`.`awbUnit`;

ALTER TABLE IF EXISTS `vn`.`awbUnit`
CHANGE COLUMN IF EXISTS `awb_unit_id` `id` varchar(10) NOT NULL DEFAULT '';