ALTER TABLE vn.deviceProductionUser DROP INDEX IF EXISTS deviceProductionUser_UN;

ALTER TABLE vn.deviceProductionUser DROP FOREIGN KEY IF EXISTS deviceProductionUser_FK;

ALTER TABLE vn.deviceProductionUser DROP PRIMARY KEY;

ALTER TABLE vn.deviceProductionUser ADD IF NOT EXISTS id INT UNSIGNED AUTO_INCREMENT NOT NULL PRIMARY KEY FIRST;

ALTER TABLE vn.deviceProductionUser ADD CONSTRAINT deviceProductionUser_deviceProduction_FK FOREIGN KEY IF NOT EXISTS (deviceProductionFk) REFERENCES vn.deviceProduction(id);

ALTER TABLE vn.deviceProductionUser ADD CONSTRAINT deviceProductionUser_unique UNIQUE KEY IF NOT EXISTS (deviceProductionFk);

ALTER TABLE vn.deviceProductionUser ADD IF NOT EXISTS simSerialNumber TEXT NULL;

ALTER TABLE vn.deviceProductionConfig ADD IF NOT EXISTS maxDevicesPerUser INT UNSIGNED NULL;

UPDATE vn.deviceProductionConfig SET maxDevicesPerUser=1 WHERE id=1;

INSERT IGNORE INTO salix.ACL (model,property,accessType,permission,principalType,principalId)
	VALUES ('Worker','getAvailablePda','READ','ALLOW','ROLE','hr');

