CREATE TABLE `vn`.`salesPersonProtected` (
	`salesPersonFk` int(10) unsigned NOT NULL,
	PRIMARY KEY (`salesPersonFk`),
	CONSTRAINT `salesPersonProtected_FK` FOREIGN KEY (`salesPersonFk`) REFERENCES `worker` (`id`) ON UPDATE CASCADE
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb3 COLLATE=utf8mb3_unicode_ci COMMENT='Lista de comerciales que no se desasignarán automáticamente los clientes';