CREATE SCHEMA IF NOT EXISTS `util`;
USE `util`;

DELIMITER ;;
DROP FUNCTION IF EXISTS `util`.`mockTime`;
CREATE OR REPLACE FUNCTION `util`.`mockTime`()
RETURNS DATETIME
DETERMINISTIC
BEGIN
    RETURN CONVERT_TZ('2001-01-01 11:00:00', 'utc', 'Europe/Madrid');
END ;;
DELIMITER ;
