DROP TABLE IF EXISTS `vn`.`personalProtectionEquipment`;
CREATE TABLE `vn`.`personalProtectionEquipment` (
	`id` INT(11) Primary Key auto_increment NOT NULL,
	`name` varchar(255) NOT NULL
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8
COLLATE=utf8_unicode_ci;
