ALTER TABLE vn.collection ADD warehouseFk smallint(6) unsigned DEFAULT 60 NOT NULL;

ALTER TABLE vn.collection ADD CONSTRAINT collection_FK2 FOREIGN KEY (warehouseFk) REFERENCES vn.warehouse(id) ON DELETE CASCADE ON UPDATE CASCADE;
