ALTER TABLE util.config
  ADD mockUtcTime DATETIME NULL,
  ADD mockEnabled TINYINT UNSIGNED NOT NULL DEFAULT FALSE,
  ADD mockTz varchar(255) NULL;

UPDATE util.config SET
  mockUtcTime = '2001-01-01 11:00:00.000',
  mockEnabled = TRUE,
  mockTz = '+01:00';
  