CREATE OR REPLACE TABLE `vn`.`scanner` (
	id INT(11) auto_increment NOT NULL,
	name varchar(100) NOT NULL,
	modelFk VARCHAR(50) NOT NULL,
	CONSTRAINT scanner_PK PRIMARY KEY (id),
	CONSTRAINT scanner_FK FOREIGN KEY (modelFk) REFERENCES vn.scannerModel(code) ON UPDATE CASCADE
)
ENGINE=InnoDB
DEFAULT CHARSET=utf8mb3
COLLATE=utf8mb3_unicode_ci;
