RENAME TABLE vn.addressShortage TO vn.addressWaste;
ALTER TABLE vn.addressWaste ADD `type` ENUM('internal', 'external') NOT NULL;
INSERT IGNORE INTO vn.addressWaste (addressFk,`type`) VALUES
    (2230,'external'),
    (5986,'external'),
    (7475,'external');
