CREATE TABLE `vn`.`supplierLog` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `originFk` int(11) NOT NULL,
  `userFk` int(10) unsigned NOT NULL,
  `action` set('insert','update','delete') COLLATE utf8_unicode_ci NOT NULL,
  `creationDate` timestamp NULL DEFAULT current_timestamp(),
  `description` text CHARACTER SET utf8 DEFAULT NULL,
  `changedModel` varchar(45) COLLATE utf8_unicode_ci DEFAULT NULL,
  `oldInstance` text COLLATE utf8_unicode_ci DEFAULT NULL,
  `newInstance` text COLLATE utf8_unicode_ci DEFAULT NULL,
  `changedModelId` int(11) DEFAULT NULL,
  `changedModelValue` varchar(45) COLLATE utf8_unicode_ci DEFAULT NULL,
  PRIMARY KEY (`id`),
  KEY `logSupplier_ibfk_1` (`originFk`),
  KEY `supplierLog_ibfk_2` (`userFk`),
  CONSTRAINT `supplierLog_ibfk_1` FOREIGN KEY (`originFk`) REFERENCES `supplier` (`id`) ON DELETE CASCADE ON UPDATE CASCADE,
  CONSTRAINT `supplierLog_ibfk_2` FOREIGN KEY (`userFk`) REFERENCES `account`.`user` (`id`) ON UPDATE CASCADE
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;


