CREATE TABLE `vn`.`userConfig` (
  `userFk` int(10) unsigned NOT NULL,
  `warehouseFk` smallint(6) DEFAULT NULL,
  `companyFk` smallint(5) unsigned DEFAULT NULL,
  `created` timestamp NULL DEFAULT CURRENT_TIMESTAMP,
  `updated` timestamp NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
  PRIMARY KEY (`userFk`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='Configuración de usuario en Salix';
