CREATE TABLE `salix`.`module` (
    `code` VARCHAR(45) COLLATE utf8_unicode_ci NOT NULL,
    PRIMARY KEY (`code`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci;